%%
%% This is file `box.def',
%% generated with the docstrip utility.
%%
%% The original source files were:
%%
%% circ.dtx  (with options: `box')
%% Copyright 1997-98  Sebastian Tannert / Andreas Tille
%% 
%% This file is part of the CIRC package
%% -------------------------------------
%%   This package is distributed in the hope that it will be useful,
%%   but WITHOUT ANY WARRANTY; without even the implied warranty of
%%   MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.
%% 
%%   For error reports concerning UNCHANGED versions of this file no
%%   more than one year old, see CIRC.DVI.
%% 
%% IMPORTANT COPYRIGHT NOTICE:
%% 
%% You are NOT ALLOWED to distribute this file alone.
%% 
%% You are allowed to distribute this file under the condition that it
%% is distributed together with all the files listed in circ.txt.
%% 
%% If you receive only some of these files from someone, complain!
%% 
%% You are NOT ALLOWED to change this file.
\ProvidesFile{box.def}
\freecirc
\bbdef        BBa         \c*fntb  252
\bbdef        BBd         \c*fntb  253
\bbdefNeT oscillograph \c*fnt  142 {}
\bbdefNeT G    \c*fntb 250 \vbox{\hc*{\symfont G}\kern1.5\*spc%
                                 \hc*{\c*fnts\char16}}
\bbdefNeT Gvar \c*fntb 250 \vbox{\hc*{\symfont G}\kern1.5\*spc%
                                 \hc*{\c*fnts\char17}}
\bbdefNeT Impulse \c*fntb 250 \c*fnts\char13
\bbdefNeT Amp  \c*fntb 250 \c*fnts\char24
\sbdef ACtoDC \c*fntb 251 \hbox{\raise.6\ht*\hbox{\c*fnts\char16}%
                                \lower.6\dp*\hbox{\symfont$=$}}
\protectcirc
\endinput
%%
%% End of file `box.def'.
