%%
%% This is file `oldgate.def',
%% generated with the docstrip utility.
%%
%% The original source files were:
%%
%% circ.dtx  (with options: `oldgate')
%% Copyright 1997-98  Sebastian Tannert / Andreas Tille
%% 
%% This file is part of the CIRC package
%% -------------------------------------
%%   This package is distributed in the hope that it will be useful,
%%   but WITHOUT ANY WARRANTY; without even the implied warranty of
%%   MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.
%% 
%%   For error reports concerning UNCHANGED versions of this file no
%%   more than one year old, see CIRC.DVI.
%% 
%% IMPORTANT COPYRIGHT NOTICE:
%% 
%% You are NOT ALLOWED to distribute this file alone.
%% 
%% You are allowed to distribute this file under the condition that it
%% is distributed together with all the files listed in circ.txt.
%% 
%% If you receive only some of these files from someone, complain!
%% 
%% You are NOT ALLOWED to change this file.
\freecirc
\NgateIIO     oldAND        \c*fntb  133 {}
\NgateIIO    oldNAND         \c*fntb  134 {}
\NgateIIO     oldOR          \c*fntb  135 {}
\NgateIIO     oldNOR         \c*fntb  136 {}
\NgateIIO     oldXOR         \c*fntb  137 {}
\protectcirc
\endinput
%%
%% End of file `oldgate.def'.
